S3Tray Plus 工作列公用程式

若要學習如何使用線上說明，請按 F1。

S3Tray Plus 是一工作列圖示，可幫助您更容易從中心位置存取 S3 Graphics 公用程式。此外，S3Tray Plus 提供其他有用的顯示功能，例如改變刷新速率或顯示模式。使用下列清單來取得更多有關 S3Tray Plus 功能的資訊。

改變螢幕尺寸及色彩數量

啟用 / 停止 S3Desk Toys

改變 S3Tray Plus 的選項

存取顯示特性

存取其他 S3 Graphics 公用程式


改變刷新速率

透過功能表中刷新速率的項目，您可輕易改變任何螢幕尺寸及色彩的刷新速率。此時將會開啟更新的對話框，它包含三個主要部分：

螢幕 � 此下拉式清單顯示多重螢幕系統可用的螢幕。如果尚未啟用多重螢幕，本清單為灰白並預設到螢幕 1。

顯示模式 � 此清單顯示所選螢幕可用的顯示模式。對每一顯示模式而言，也會顯示目前的刷新速率。


啟用 / 停止 S3Desk Toys

S3DeskToys 是視窗及桌面管理的公用程式，允許您在多重螢幕設定中控制視窗及對話框操作，並提供虛擬桌面給不支援多重螢幕的系統。此外，系統中可加入一些微調及特別效應。簡言之，可提供下列功能：

桌面管理� S3DeskToys 允許您用多重螢幕環境管理視窗與對話框。您可控制視窗是否放至最大到目前螢幕、特定螢幕或橫跨所有螢幕，也可決定對話框是否在目前螢幕、特定螢幕或橫跨所有螢幕置中。

虛擬桌面� S3DeskToys 也提供虛擬桌面，或vdesk (虛擬桌面)，來擴展可用的工作區域。每一個虛擬桌面可擁有自己一套背景、桌布、應用程式及視窗。您可輕易切換不同的虛擬桌面，並將應用程式從一桌面移到另一桌面，也可指名特定應用程式在所有虛擬桌面出現。

特別效應 � 當拖曳或停用特定視窗時，您可使特定視窗變得透明，並可控制透明的程度。這些功能只在 Windows 2000、Windows XP 或更新的版本才有。

工作列鎖定 � 在 Windows 95/98/ME 及 Windows 2000 中，您可鎖定工作列來防止工作列意外地改變尺寸或移動。


改變 S3Tray Plus 選項

您可調整 S3Tray Plus 運作的方式設定個人喜好，可用的選項有：

顯示改變顯示模式的功能表

套用新設定前重新開機

不經使用者確認即可套用設定

以使用者確認套用設定

顯示功能表之公用程式

顯示公用程式加入的功能表項目

顯示酷功能表

顯示功能表之旗幟

當 Windows 啟動時載入


存取顯示特性

使用功能表中「調整顯示特性」的項目，您可迅速至顯示特性並跳到設定頁。


存取其他 S3 Graphics 公用程式

您可在功能表使用公用程式項目避開顯示特性螢幕，並直接存取 S3 Graphics 公用程式。在功能表中，相容 S3 Graphics 公用程式會以附加的「所有公用程式」項目列出。

選擇一個公用程式立刻開啟公用程式特性頁面。公用程式操作，事實上就像您一般在顯示特性中看見的一樣，但存取更為簡便、快速。

選擇「所有公用程式」，以所有用標籤聚集一起的 S3 Graphics 公用程式，做成組合特性表。


顯示模式為使用的螢幕尺寸及色彩數量的組合。


顯示公用程式的版本。


按這裡開啟本產品的網頁。


顯示 OEM 或產品標誌。


螢幕：顯示系統可用的螢幕。如果未啟用多重螢幕，本清單將為灰白。從本清單選擇螢幕，顯示螢幕可用的刷新速率。


顯示模式：以目前每一模式的刷新速率，顯示所選螢幕可用的顯示模式。選擇顯示模式顯示刷新速率清單，以便改變模式的刷新速率。


刷新速率清單：當您選擇顯示模式時，會出現刷新速率清單。可使用本清單為所選模式選擇新的刷新速率。


測試：儲存任何改變前，按這裡測試所選的顯示模式及刷新速率。S3Tray Plus 會改變顯示到新模式及刷新速率，並稍等 15 秒確認改變已完成。如果您回答否（在鍵盤按 N 或 ESC），S3Tray Plus 會立刻回復到原來的顯示設定。


顯示螢幕設定功能表，以便快速改變螢幕尺寸及色彩。


改變系統顯示設定時，指定電腦自動重新開機。


改變系統色彩設定時，指定電腦自動重新開機。


指定電腦套用改變到系統顯示設定而不重新開機。

設定改變後不重新開機，有些程式可能無法正確顯示色彩。為避免此一問題，關閉該程式，改變設定，然後再開啟程式。


 指定電腦套用改變到系統色彩設定而不重新開機。

設定改變後不重新開機，有些程式可能無法正確顯示色彩。為避免此一問題，關閉該程式，改變色彩設定，然後再開啟程式。


每次改變顯示設定時，需指定 S3Tray Plus 是否應顯示提示符號確認。


指定 S3Tray Plus 是否應提供公用程式功能表，以便快速存取其他 S3 Graphics 公用程式。如果未檢查此功能，您仍可在顯示特性或顯示特性的進階設定頁面中存取公用程式。


指定 S3Tray Plus 是否應顯示其他 S3 Graphics 公用程式提供的額外功能表項目。例如，顯示切換公用程式可提供功能表項目，以便開啟或關閉不同的顯示。


指定 S3Tray Plus 應在 Windows 啟動時載入。


檢查此一工作列圖示以每一項目的圖示來顯示圖形功能表。


檢查此一工作列圖示功能表側面具有旗幟圖形，這個選項只用在已檢查圖示功能表時。


Added/Changed text needing localization


在不關閉對話方塊下，儲存所有您已作的改變。


當喚起托盤圖示功能表時，指定公用程式應檢查新的裝置連線前會消逝多少時間。因為檢查新的裝置可能會造成顯示閃爍，您可改變設定來降低發生次數。

當您喚起托盤圖示功能表時，增長週期會降低看見螢幕閃爍的次數，但在某些案例中，可能無法檢測出新的連線裝置並在功能表中停用。當您喚起托盤圖示功能表時，縮短週期會允許新的連線裝置更輕易被檢測出，但將造成螢幕閃爍更頻繁。

為了在時間消逝前強迫檢查新裝置，按下功能表的托盤圖示同時，按住下拉Shift按鍵。為了防止裝置連線檢查，按下功能表的托盤圖示同時，按住下拉Control按鍵。


改變螢幕尺寸及色彩數目

您可輕易從「顯示模式」功能表(或多重監控系統的「顯示1模式」、「顯示2模式」等等)改變顯示模式彈出_顯示_模式。這功能表項目顯示可得的螢幕尺寸，並以色彩數目來聚集一起。每一可得的顯示模式在功能表中，以�<寬度> x <高度> (<色彩> bpp)�的型式具有自己的入口。例如，剛開始幾個模式通常是�640x480 (8bpp)�及�800x600 (8bpp)�。目前的顯示模式會以圓點標示。

為了將顯示改變到另一模式，只要選擇具有想要的螢幕尺寸及色彩數目的模式。依照「選項」螢幕中的選擇，會要求您先確認選擇，而若色彩數目改變，S3Tray Plus會要求重新啟動您的電腦。若要取得更多資訊，請參閱《改變選項》。


版權公告

�2004年S3 Graphics有限公司版權所有。保留所有權利。在此包含之資訊是S3 Graphics獨有之財產，在未經S3 Graphics先前書面許可前不得整體或部分散佈、重新製造或公開。若您已收到從S3 Graphics寄來的電子檔型式文件，即允許您對S3 Graphics產品作以下商業用拷貝：一用來在電腦上線上檢視的副本，以及一印刷副本。關於所有文件，不管是以硬拷貝或電子檔型式接收，其他用途，拷貝或儲存，整體或部分，藉任何方式，電子、機械、影印或其他方法，在未經S3 Graphics有限公司，1045 Mission Court, Fremont, CA 94539, USA，先前書面同意前是不被允許的。S3 是S3 組織的註冊商標。AlphaChrome、DeltaChrome、DuoView、ProSavage、Savage、Savage4、SavageXP、Streams Processor、SuperSavage、Twister 以及 UniChrome 是 S3 Graphics 的商標。本文件其他相關商標是由其各自的公司擁有。本文件中的物件只當作資訊參考，並且在未公告下可接受改變。S3 Graphics保留權利在不對其使用者保留及公告下可對產品設計作改變。